\section{Original Resolutions without the Buccaneer Development Dataset}


\begin{table}[H]

\label{TheNumberOfCompleteAndIntermediateOrgianl1}
\caption{Complete and intermediate models produced by the 7~pipeline variants for the original datasets, where `(T)' and `(C)' denote intermediate models produced by pipeline executions that timed out and crashed, respectively.}


\begin{tabular}{llllllllllllllllllll}      % Alignment for each cell: l=left, c=center, r=right
\input{Tables/Original/TheNumberOfCompletedCases.tex}
\end{tabular}
\end{table}

\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with higher structure completeness than each of the other pipeline variants.}

\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsCom0}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with equal structure completeness to each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsCom0Equivalent}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with at least 5\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsCom5}
\end{tabular}
\end{table}


\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with between 1\% and 4\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsCom5Equivalent}
\end{tabular}
\end{table}



\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original HA-NCS datasets. Each row shows the percentage of models thata pipeline variant built with lower R-work or R-free than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsRModels}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original HA-NCS datasets. Each row shows the percentage of models that a pipeline variant built with equal R-work or R-free to each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsREquivalentModels}
\end{tabular}
\end{table}


\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original HA-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free at least 5\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsR5Models}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original HA-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free between 1\% and 4\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultshancsREquivalent5Models}
\end{tabular}
\end{table}



\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsCom0}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with equal structure completeness to each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsCom0Equivalent}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with at least 5\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsCom5}
\end{tabular}
\end{table}


\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with between 1\% and 4\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsCom5Equivalent}
\end{tabular}
\end{table}



\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with lower R-work or R-free than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsRModels}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with equal R-work or R-free to each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsREquivalentModels}
\end{tabular}
\end{table}


\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free at least 5\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsR5Models}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free between 1\% and 4\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsmrncsREquivalent5Models}
\end{tabular}
\end{table}




\begin{table}[H]
\label{CompletenessNoncs0}
\caption{Structure completeness comparison for the models generated from the original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage (rounded to the nearest integer) of models that the pipeline variant built with higher structure completeness than each of the other pipeline variants. 
}

%\vspace*{3mm}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsCom0}
\end{tabular}
\end{table}

\begin{table}[H]
\label{CompletenessNoncs5}

%\vspace*{3mm}
\caption{
Structure completeness comparison for the models generated from the original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage (rounded to the nearest integer) of models that the pipeline variant built with at least 5\%~higher structure completeness than each of the other pipeline variants.
}

%\vspace*{2mm}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsCom5}
\end{tabular}

%\vspace*{3mm}
\end{table}


\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with equal structure completeness to each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsCom0Equivalent}
\end{tabular}
\end{table}




\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with between 1\% and 4\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsCom5Equivalent}
\end{tabular}
\end{table}


\begin{table}[H]
\label{R0Noncs}
\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with lower R-work or R-free than each other pipeline variant.}

%\vspace*{2mm}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsRModels}
\end{tabular}
\end{table}



\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with equal R-work or R-free to each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsREquivalentModels}
\end{tabular}
\end{table}

\begin{table}[H]
\label{R5Noncs}
\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free at least 5\% lower than each other pipeline variant.}

%\vspace*{2mm}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsR5Models}
\end{tabular}
\end{table}


\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free between 1\% and 4\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/Original/MatrixOfResultsnoncsREquivalent5Models}
\end{tabular}
\end{table}




