\section{The Results of the Original Datasets Used in Buccaneer Development  \label{subsect:BuccaneerDevDataset}}

\begin{table}[H]

\caption{Complete and intermediate models produced by the 7 pipeline variants for the 52 original datasets, where (T)€™ and €˜(C)€™ denote intermediate models produced by pipeline executions that timed out and crashed, respectively.}

\begin{tabular}{llllllllllllllllllll}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/TheNumberOfCompletedCases.tex}
\end{tabular}
\end{table}

\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the 52 original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsCom0}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the 52 original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with equal structure completeness to each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsCom0Equivalent}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the 52 original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with at least 5\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsCom5}
\end{tabular}
\end{table}


\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the 52 original HA-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with between 1\% and 4\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsCom5Equivalent}
\end{tabular}
\end{table}



\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original HA-NCS datasets. Each row shows the percentage of models thata pipeline variant built with lower R-work or R-free than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsRModels}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original HA-NCS datasets. Each row shows the percentage of models thata pipeline variant built with equal R-work or R-free to each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsREquivalentModels}
\end{tabular}
\end{table}


\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original HA-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free at least 5\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsR5Models}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original HA-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free between 1\% and 4\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultshancsREquivalent5Models}
\end{tabular}
\end{table}

\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the 52 original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsCom0}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the 52 original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with equal structure completeness to each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsCom0Equivalent}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the 52 original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with at least 5\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsCom5}
\end{tabular}
\end{table}


\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the 52 original MR-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with between 1\% and 4\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsCom5Equivalent}
\end{tabular}
\end{table}



\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with lower R-work or R-free than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsRModels}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with equal R-work or R-free to each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsREquivalentModels}
\end{tabular}
\end{table}


\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free at least 5\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsR5Models}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original MR-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free between 1\% and 4\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsmrncsREquivalent5Models}
\end{tabular}
\end{table}

\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the 52 original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsCom0}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the 52 original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with equal structure completeness to each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsCom0Equivalent}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Structure completeness comparison for the models generated from the 52 original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with at least 5\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsCom5}
\end{tabular}
\end{table}


\begin{table}[H]
\caption{Structure completeness comparison for the models generated from the 52 original NO-NCS datasets. Each row corresponds to a pipeline variant, and shows the percentage(rounded to the nearest integer) of models that the pipeline variant built with between 1\% and 4\% higher structure completeness than each of the other pipeline variants.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsCom5Equivalent}
\end{tabular}
\end{table}



\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with lower R-work or R-free than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsRModels}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with equal R-work or R-free to each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsREquivalentModels}
\end{tabular}
\end{table}


\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free at least 5\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsR5Models}
\end{tabular}
\end{table}

\begin{table}[H]

\caption{Comparison of R-work/R-free (rounded to two decimal places) for the models generated from the 52 original NO-NCS datasets. Each row shows the percentage of models that a pipeline variant built with R-work or R-free between 1\% and 4\% lower than each other pipeline variant.}
\begin{tabular}{lcccccccccccccccccccccc}      % Alignment for each cell: l=left, c=center, r=right
 
  \input{Tables/BuccaneerDevDataset/MatrixOfResultsnoncsREquivalent5Models}
\end{tabular}
\end{table}